Lo w er Coronal Magnetic Diagnostic of Micro w a v e Burst Regions Zhou Ai-Hua Purpule Moun tain Observ atory , Acadimia Sinica, Nanjing , 210008, P . R. China In this pap er t w o diagnostic form ulas of magnetic �eld strength of gyrosyn- chrotron radiation regions are presen ted for the low er and higher harmonics, based on their form ulas(Zhou et al., 1998) with higher precision of emissivit y , absorptivity and the turnov erfrequueency of radio sp ectra . The diagnostic errors are analysed. And some diagnostic results are given ab out low er coronal magnetic and energetic electrons of some microw a v e burst even ts. 1