RESUL TS FR OM THE GA URIBID ANUR RADIOHELIOGRAPH IN ITS FIRST YEAR OF OPERA TION R. Ramesh, K.R. Subramanian and Ch.V. Sastry Indian Institute of Astroph ysics, Bangalore - 560 034, INDIA. A new radioheliograph op erating in the frequency range 40-150 MHz has b een re- cently commissioned at the Gauribidanur Radio Observ atory by the Indian Institute of Astrophysics. It is a T-shap ed arra y of 192 log p erio dic antennas with the long arm in the E-W direction and the short arm in the South direction. At presen t this is the only instrumen t in the w orld capable of imaging the outer solar corona at several frequencies sim ultaneously in the ab o v e frequency range. Routine observ ations are b eing carried out from April, 1997 onw ards. A brief description of the instrumen t and some of the new observ ational results on quiet Sun and CME’s are rep orted. 1